1 Grundzustand: 2 3 E_num = +0.900000 . 4 E_num = +0.988598. 5 E_num = +0.999834. 6 E_num = +1.000000. 7 8 1. angeregter Zustand: 9 10 E_num = +2.900000 . 11 E_num = +2.988617. 12 E_num = +2.999835. 13 E_num = +3.000000. 14 15 2. angeregter Zustand: 16 17 E_num = +4.900000 . 18 E_num = +4.990699. 19 E_num = +4.999911. 20 E_num = +5.000000. 21 22 3. angeregter Zustand: 23 24 E_num = +6.900000 . 25 E_num = +6.990720. 26 E_num = +6.999911. 27 E_num = +7.000000.