1 Grundzustand: 2 3 E_num = +10.000000 . 4 E_num = +9.868296 , E_ana = +9.869604 , \psi(x=1) = -0.006541 . 5 E_num = +9.869604 , E_ana = +9.869604 , \psi(x=1) = +0.000066 . 6 E_num = +9.869604 , E_ana = +9.869604 , \psi(x=1) = +0.000000 . 7 8 9 10 1. angeregter Zustand: 11 12 E_num = +40.000000 . 13 E_num = +39.472958 , E_ana = +39.478418 , \psi(x=1) = +0.006539 . 14 E_num = +39.478417 , E_ana = +39.478418 , \psi(x=1) = -0.000069 . 15 E_num = +39.478418 , E_ana = +39.478418 , \psi(x=1) = -0.000000 . 16 17 18 19 2. angeregter Zustand: 20 21 E_num = +90.000000 . 22 E_num = +88.813303 , E_ana = +88.826440 , \psi(x=1) = -0.006537 . 23 E_num = +88.826438 , E_ana = +88.826440 , \psi(x=1) = +0.000074 . 24 E_num = +88.826440 , E_ana = +88.826440 , \psi(x=1) = +0.000000 .